From 11e09a23beb89c3b7bf06209a317a4b6ac75ee38 Mon Sep 17 00:00:00 2001
From: Anatol Pomozov <anatol.pomozov@gmail.com>
Date: Tue, 8 Dec 2020 11:57:27 -0800
Subject: Implement TotalDownload functionality

With the recent 'multibar' interface changes TotalDownload has been disabled.
Now we have a new UI and we need to find another way to display this
information.

When 'TotalDownload' config option is enabled we are going to have an extra
progress bar at the bottom of the screen that shows how much of the entire
download has been completed.

Closes FS#68202

Signed-off-by: Anatol Pomozov <anatol.pomozov@gmail.com>
Signed-off-by: Allan McRae <allan@archlinux.org>
---
 doc/pacman.conf.5.asciidoc | 6 ++----
 1 file changed, 2 insertions(+), 4 deletions(-)

(limited to 'doc/pacman.conf.5.asciidoc')

diff --git a/doc/pacman.conf.5.asciidoc b/doc/pacman.conf.5.asciidoc
index 3c2f1fea..9bd31916 100644
--- a/doc/pacman.conf.5.asciidoc
+++ b/doc/pacman.conf.5.asciidoc
@@ -191,10 +191,8 @@ Options
 	not support escape characters.
 
 *TotalDownload*::
-	When downloading, display the amount downloaded, download rate, ETA,
-	and completed percentage of the entire download list rather
-	than the percent of each individual download target. The progress
-	bar is still based solely on the current file download.
+	When downloading, display an extra progress bar with the amount downloaded,
+	download rate, ETA, and completed percentage of the entire download list.
 	This option won't work if XferCommand is used.
 
 *CheckSpace*::
-- 
cgit v1.2.3-54-g00ecf

